%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{2585} Alejandro Gonzalez Alzate, Gabriel Villalonga, German Ros, David Vazquez, \& Antonio Lopez. (2015). 3D-Guided Multiscale Sliding Window for Pedestrian Detection. In \textit{Pattern Recognition and Image Analysis, Proceedings of 7th Iberian Conference , ibPRIA 2015} (Vol. 9117, pp. 560--568).

\end{thebibliography}

\end{document}

