%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{2417} Ferran Poveda. (2013). \textit{Computer Graphics and Vision Techniques for the Study of the Muscular Fiber Architecture of the Myocardium}  (Debora Gil, \& Enric Marti, Eds.). Ph.D. thesis, , .

\end{thebibliography}

\end{document}

