%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{1769} Antonio Hernandez, Carlo Gatta, Sergio Escalera, Laura Igual, Victoria Martin Yuste, \& Petia Radeva. (2011). Accurate and Robust Fully-Automatic QCA: Method and Numerical  Validation. In \textit{14th International Conference on Medical Image Computing and Computer Assisted Intervention} (Vol. 14, pp. 496--503). Springer.

\end{thebibliography}

\end{document}

