%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{1491} Cristina Ca{\~n}ero, Petia Radeva, Oriol Pujol, Ricardo Toledo, Debora Gil, J. Saludes, et al. (1999). Optimal Stent Implantation: Three-dimensional Evaluation of the Mutual Position of Stent and Vessel via Intracoronary Ecography. In \textit{Proceedings of International Conference on Computer in Cardiology (CIC{\textasciiacute}99)}.

\end{thebibliography}

\end{document}

