%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{1037} Carlo Gatta, Oriol Pujol, Oriol Rodriguez-Leor, J. Mauri, \& Petia Radeva. (2008). Robust Image-based IVUS Pullbacks Gating. In \textit{Proceedings 11th International ConferenceMedical Image Computing and Computer{\textendash}Assisted Intervention} (Vol. 5242, pp. 518--525). LNCS.

\end{thebibliography}

\end{document}

