%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{15}

\bibitem{1285} O. Fors, J. Nu{\~n}ez, Xavier Otazu, A. Prades, \& Robert D. Cardinal. (2010). Improving the Ability of Image Sensors to Detect Faint Stars and Moving Objects Using Image Deconvolution Techniques. \textit{SENS - Sensors}, \textit{10}(3), 1743--1752.

\end{thebibliography}

\end{document}

