%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{15}

\bibitem{2617} Olivier Lefebvre \textit{and 6 others}. 2015. Monitoring neuromotricity on-line: a cloud computing approach. \textit{17th Conference of the International Graphonomics Society IGS2015}.

\end{thebibliography}

\end{document}

