%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{15}

\bibitem{1868} N. Serrano, L. Tarazon, D. Perez, Oriol Ramos Terrades and S. Juan. 2010. The GIDOC Prototype. \textit{10th International Workshop on Pattern Recognition in Information Systems}.82--89.

\end{thebibliography}

\end{document}

