%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{3043} Debora Gil, Rosa Maria Ortiz, Carles Sanchez, \& Antoni Rosell. (2018). Objective endoscopic measurements of central airway stenosis. A pilot study. \textit{RES - Respiration}, \textit{95}, 63--69.

\end{thebibliography}

\end{document}

